FDISK Ñ╣ÑΘÑñÑ╣Ñ¿Ñ╟ÑúÑ┐ (PC Ñ╣Ñ┐ÑñÑδñ╬Ñ╤í╝Ñ╞ÑúÑ╖ÑτÑ≤Ñ¿Ñ╟ÑúÑ┐)

▓Φ╠╠▓╝ñ╦ñ╧ñ│ñ╬▓Φ╠╠ñ╟╗╚═╤ñ╟ñ¡ñδÑ│Ñ▐Ñ≤Ñ╔ñ¼íó╛σñ╦ñ╧ MBR (Ñ▐Ñ╣Ñ┐Ñ╓í╝Ñ╚Ñ∞Ñ│í╝
Ñ╔) ñ╬╞Γ═╞ñ¼╔╜╝¿ñ╡ñ∞ñ╞ñññ▐ñ╣íú┐╖ñ╖ñ»Ñ╣ÑΘÑñÑ╣ñ≥║εñδñ╦ñ╧íóÑ½í╝Ñ╜ÑδÑ¡í╝ñ≥
╗╚ñ├ñ╞Ñ╧ÑñÑΘÑñÑ╚Ñ╨í╝ñ≥ "unused" ñ╦ñ╩ñ├ñ╞ñññδÑ╣ÑΘÑñÑ╣╛σñ╦╗²ñ├ñ╞ñññ¡íó
í╓C = ║ε└«í╫ñ≥Ñ┐ÑñÑ╫ñ╖ñ╞ñ»ñ└ñ╡ññíú

ñ│ñ╬▓Φ╠╠ñ½ñΘ╚┤ñ▒ñδ┴░ñ╦ñ╧íó╛»ñ╩ñ»ñ╚ñΓ░∞ñ─ñ╬Ñ╣ÑΘÑñÑ╣ñ≥ FreeBSD ═╤
ñ╦Ñ▐í╝Ñ»ñ╖ñ╞ñ»ñ└ñ╡ññíú Linux ñ╚ñ╧░πñ├ñ╞íóÑ╣Ñ∩Ñ├Ñ╫ñΣÑ╒ÑíÑñÑδÑ╖Ñ╣Ñ╞Ñαñ╬
ñ┐ñßñ╦╩╠í╣ñ╬ FDISK Ñ╤í╝Ñ╞ÑúÑ╖ÑτÑ≤ñ≥║εñδ╔¼═╫ñ╧ñóñΩñ▐ñ╗ñ≤íú╔ß─╠ñ╬╗╚ññ╩²
ñ╟ñ╧íóÑ╔ÑΘÑñÑ╓╦Φñ╦ FreeBSD Ñ╣ÑΘÑñÑ╣ (FDISK Ñ╤í╝Ñ╞ÑúÑ╖ÑτÑ≤) ñ≥░∞ñ─║εñΩíó
ÑΘÑ┘ÑδÑ¿Ñ╟ÑúÑ┐ñ≥╗╚ñ├ñ╞íóñ╜ñ∞ñ≥Ñ╣Ñ∩Ñ├Ñ╫ñΣÑ╒ÑíÑñÑδÑ╖Ñ╣Ñ╞Ñαñ╬ñ┐ñßñ╬╬╬░Φñ╦
╩¼│Σñ╖ñ▐ñ╣íú

ÑñÑ≤Ñ╣Ñ╚í╝ÑδÑßÑ╦Ñσí╝ñ╟í╓Commití╫ñ╣ñδñ½íóñ│ñ│ñ╟í╓W = ╜±ñ¡╣■ñ▀í╫Ñ¬Ñ╫Ñ╖Ñτ
Ñ≤ñ≥╗╚ñªñ▐ñ╟íóÑ╟ÑúÑ╣Ñ»ñ╦ñ╧░∞└┌ñ╬╩╤╣╣ñ╧▓├ñ¿ñΘñ∞ñ▐ñ╗ñ≤íúñ│ñ╬▓Φ╠╠ñ╚ÑΘÑ┘Ñδ
Ñ¿Ñ╟ÑúÑ┐ñ╟ñ╬╩╤╣╣ñ╧íóÑ╟ÑúÑ╣Ñ»ÑΘÑ┘Ñδñ╬║ε╢╚═╤Ñ│Ñ╘í╝ñ╦┬╨ñ╖ñ╞ñ¬ñ│ñ╩ñ∩ñ∞ñ▐ñ╣íú

Ñ╟ÑúÑ╣Ñ»┴┤┬╬ñ≥ FreeBSD ñ╟╗╚ñññ┐ññ╗■ñ╦ñ╧íó`A' ñ╚Ñ┐ÑñÑ╫ñ╖ñ╞ñ»ñ└ñ╡ññíúñ╣
ñδñ╚íóÑ╟ÑúÑ╣Ñ»ñ≥┬╛ñ╬ OS ñ╟ñΓ╟º╝▒▓─╟╜ñ╦ñ╣ñδñ½ñ╔ñªñ½íóñ─ñ▐ñΩ FDISK Ñ╞í╝
Ñ╓Ñδñ≥═¡╕·ñ╦ñ╣ñδñ½ñ╔ñªñ½ñ≥ñ┐ñ║ñ═ñΘñ∞ñ▐ñ╣íúÑ╟Ñ╒Ñ⌐ÑδÑ╚ñ╬ `Yes' ñ≥┴¬ñ╓ñ╚íó
Ñ╣ÑΘÑñÑ╣ñ≥▓╛┴█Ñ╖ÑΩÑ≤Ñ└╢¡│ªñ½ñΘ│½╗╧ñ╖ñ╞íóÑ╓í╝Ñ╚Ñ▐Ñ═í╝Ñ╕Ñπñ╬╞■ñδ╬╬░Φñ≥═╜
╠≤ñ╖ñ▐ñ╣íú

FreeBSD └∞═╤ñ╦ñ╣ñδÑ╟ÑúÑ╣Ñ»ñ╟ñ╧íó╕▀┤╣Ñ╫ÑφÑ≤Ñ╫Ñ╚ñ╟ `No' ñ≥┴¬ñ╓╗÷ñΓñ╟ñ¡ñ▐
ñ╣íúñ╜ñ╬╛∞╣τ BIOS ñ╬Ñ╕Ñ¬ÑßÑ╚ÑΩ╛≡╩≤ñ╧ñ▐ñ├ñ┐ñ»╗╚ñ∩ñ∞ñ▐ñ╗ñ≤ñ½ñΘíó╕σñ╦╖┘╣≡
ÑßÑ├Ñ╗í╝Ñ╕í╓╕í╜╨ñ╡ñ∞ñ┐Ñ╕Ñ¬ÑßÑ╚ÑΩñ¼╔╘└╡ñ╟ñ╣í╫ñ≥╕½ñδ╗÷ñ╦ñ╩ñδñ½ñΓñ╖ñ∞ñ▐ñ╗
ñ≤ñ¼íó╠╡╗δñ╖ñ╞╣╜ñññ▐ñ╗ñ≤íúñ▐ñ┐íóÑ╣ÑΘÑñÑ╣ñ≥Ñ╓í╝Ñ╚▓─╟╜ñ╦ñ╖ñ┐ñΩ MBR 
Ñ╓í╝Ñ╚Ñ▐Ñ═í╝Ñ╕Ñπñ≥ÑñÑ≤Ñ╣Ñ╚í╝Ñδñ╣ñδ╔¼═╫ñ╧ñóñΩñ▐ñ╗ñ≤íú (░╒╠úñ¼ñ╩ñ»└▀─ΩñΓ
ñ╟ñ¡ñ▐ñ╗ñ≤)

FreeBSD Ñ╣ÑΘÑñÑ╣ñ╧íóÑ╟ÑúÑ╣Ñ»ñ╬└Σ┬╨Ñ╗Ñ»Ñ┐ 0 ñ½ñΘ╗╧ñ▐ñΩ (FreeBSD ñ╬Ñ╟Ñú
Ñ╣Ñ»ÑΘÑ┘Ñδñ╧─╠╛∩ñ╧ MBR ñ¼ñóñδ░╠├╓ñ╦├╓ñ½ñ∞ñ▐ñ╣)íóÑ╟ÑúÑ╣Ñ»ÑßÑ╟ÑúÑóñ╬║╟╜¬
Ñ╗Ñ»Ñ┐ñ▐ñ╟┬│ñ¡ñ▐ñ╣íú┼÷┴│íóñ│ñ╬Ñ╟ÑúÑ╣Ñ»ñ╦ñ╧Ñ╓í╝Ñ╚Ñ▐Ñ═í╝Ñ╕ÑπñΣÑ╟ÑúÑ╣Ñ»Ñ▐
Ñ═í╝Ñ╕Ñπ┼∙ñ╬íó BIOS ñ≥╔¼═╫ñ╚ñ╣ñδÑ╫ÑφÑ░ÑΘÑαñ╧░∞└┌├╓ñ▒ñ▐ñ╗ñ≤íúñ│ñ╬Ñ¬Ñ╫Ñ╖Ñτ
Ñ≤ñ╧íóSCSI Ñ╟ÑúÑ╣Ñ»ñΣ┬┐ñ»ñ╬ IDE Ñ╟ÑúÑ╣Ñ»ñ╦┤╪ñ╖ñ╞ñ╬ñ▀░┬┴┤ñ└ñ╚╕└ñ¿íó▓╚─φ
═╤ PC ñ╟ñ╧ñ╩ñ»ñ╞íóFreeBSD └∞═╤ñ╬Ñ╡í╝Ñ╨ñΣÑ∩í╝Ñ»Ñ╣Ñ╞í╝Ñ╖ÑτÑ≤ñ≥╬⌐ñ┴╛σñ▓ñδ
╛∞╣τñ╬╗÷ñ≥╣═ñ¿ñ╞═╤░╒ñ╡ñ∞ñ╞ñññ▐ñ╣íú

Ñ╒ÑΘÑ░ñ╧╝íñ╬ñΦñªñ╩░╒╠úñ╟ñ╣íú

        '='  -- Ñ╣ÑΘÑñÑ╣ñ¼ (Ñ╚ÑΘÑ├Ñ»╢¡│ªñ╦) └░╬≤ñ╡ñ∞ñ╞ñññ▐ñ╣íú
        '>'  -- Ñ╣ÑΘÑñÑ╣ñ╬╜¬ñΩñ¼ 1024 Ñ╖ÑΩÑ≤Ñ└ñ≥▒█ñ¿ñ╞ñññ▐ñ╣íú
        'R'  -- Ñ╣ÑΘÑñÑ╣ñ╧ Ñδí╝Ñ╚ (/) Ñ╒ÑíÑñÑδÑ╖Ñ╣Ñ╞Ñαñ≥┤▐ñ≤ñ╟ñññ▐ñ╣íú
        'B'  -- Ñ╣ÑΘÑñÑ╣ñ╧ BAD144 (╔╘╬╔Ñ╓ÑφÑ├Ñ»─┤║║) ñ≥Ñ╡Ñ▌í╝Ñ╚ñ╖ñ▐ñ╣íú
        'C'  -- FreeBSD 2.0 ╕▀┤╣ñ╬Ñ╣ÑΘÑñÑ╣ñ╟ñ╣íú (Ñ╟Ñ╒Ñ⌐ÑδÑ╚)
        'A'  -- Ñ╓í╝Ñ╚▓─╟╜Ñ╣ÑΘÑñÑ╣ñ╟ñ╣íú

BAD144 ñ≥┴¬┬≥ñ╖ñ┐Ñ╣ÑΘÑñÑ╣ñ╟ñ╧íóÑ╒ÑíÑñÑδÑ╖Ñ╣Ñ╞Ñαñ≥┐╖ñ╖ñ»║εñδ╦Φñ╦
╔╘╬╔Ñ╓ÑφÑ├Ñ»ñ≥├╡ñ╖ñ▐ñ╣íú

ñ│ñ╬▓Φ╠╠ñ≥╚┤ñ▒ñδñ▐ñ╟ñ╦íóñ╔ñ∞ñ½░∞ñ─ñ╬Ñ╣ÑΘÑñÑ╣ñ≥Ñ╓í╝Ñ╚▓─╟╜ñ╦ñ╣ñδ
╔¼═╫ñ¼ñóñΩñ▐ñ╣íúñ╔ñ∞ñΓÑ╓í╝Ñ╚▓─╟╜ñ╦ñ╖ñ╩ññ╛∞╣τñ╦ñ╧Ñ╓í╝Ñ╚Ñ▐Ñ═í╝Ñ╕Ñπñ≥ÑñÑ≤
Ñ╣Ñ╚í╝Ñδñ╖ñ╞ñ»ñ└ñ╡ññíú

Ñ╣ÑΘÑñÑ╣Ñ¿Ñ╟ÑúÑ┐ñ≥╚┤ñ▒ñδñ╦ñ╧ `Q' ñ≥Ñ┐ÑñÑ╫ñ╖ñ▐ñ╣íú

# Original revision: 1.3.2.3
$Id: slice.hlp,v 1.2 2000/07/10 14:38:16 toshi Exp $
